Pedestals Calib 8560.1

-1

0

1

260 280 300 320 Hut 2.3.3

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.4

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.5

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.6

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.7

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.8

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.9

HI gain 0.0 LO gain 0.0

0 25 50

300 350 400 Hut 2.3.10

HI gain 392.9 LO gain 329.1

-1

0

1

260 280 300 320

Hut 2.3.11

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.12

HI gain 0.0 LO gain 0.0

Pedestals Calib 8560.1

-1

0

1

260 280 300 320

Hut 2.3.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.14

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.3

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.4

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.5

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.6

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.7

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.8

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.9

HI gain 0.0 LO gain 0.0

0

50

100

400 450 500 Hut 2.4.10

HI gain 459.2 LO gain 411.1

Pedestals Calib 8560.1

-1

0

1

260 280 300 320

Hut 2.4.11

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.12

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320

Hut 2.4.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.14

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.5.3

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.5.4

HI gain 0.0 LO gain 0.0

0 50 100

255 260 265 270 Hut 2.5.5

HI gain 0.0 LO gain 395.6

0

50

100

260 270 Hut 2.5.6

HI gain 0.0 LO gain 403.7

0 50 100

260 270 280 290 Hut 2.5.7

HI gain 0.0 LO gain 442.9

0 50 100

260 270 280 Hut 2.5.8

HI gain 0.0 LO gain 426.5

Pedestals Calib 8560.1

0

20

255 260 Hut 2.5.9

HI gain 0.0 LO gain 375.8

0 50 100

350 400 450 Hut 2.5.10

HI gain 414.2 LO gain 377.0

0 50 100

260 280 300 320

Hut 2.6.3

HI gain 0.0 LO gain 491.3

0 50 100

260 270 Hut 2.6.4

HI gain 0.0 LO gain 401.9

0 50 100

260 280 300 320 Hut 2.6.5

HI gain 0.0 LO gain 525.0

0 50 100

260 280 300 Hut 2.6.6

HI gain 0.0 LO gain 484.4

0

100

251 252 253 254 255 Hut 2.6.7

HI gain 0.0 LO gain 359.3

0

100

260 270 280 290 Hut 2.6.8

HI gain 0.0 LO gain 436.7

0

100

260 270 Hut 2.6.9

HI gain 0.0 LO gain 408.8

0 50 100

350 400 450 Hut 2.6.10

HI gain 389.8 LO gain 376.2

Pedestals Calib 8560.1

-1

0

1

260 280 300 320

Hut 2.6.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.6.14

HI gain 0.0 LO gain 0.0

0 50 100

252.5 255 257.5 260 262.5 Hut 2.7.3

HI gain 0.0 LO gain 374.4

0 50 100

260 270 280 Hut 2.7.4

HI gain 0.0 LO gain 417.4

0 50 100

260 270 280 Hut 2.7.5

HI gain 0.0 LO gain 425.5

0 50 100

260 270 280 290 Hut 2.7.6

HI gain 0.0 LO gain 431.7

0

50

252 254 256 Hut 2.7.7

HI gain 0.0 LO gain 364.4

0

50

100

260 280 300 Hut 2.7.8

HI gain 0.0 LO gain 473.3

0

50

100

260 270 Hut 2.7.9

HI gain 0.0 LO gain 401.7

0

100

400 450 500 Hut 2.7.10

HI gain 399.6 LO gain 451.6

Pedestals Calib 8560.1

-1

0

1

260 280 300 320

Hut 2.7.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.7.14

HI gain 0.0 LO gain 0.0

0 50 100

255 260 265 270 Hut 2.8.3

HI gain 0.0 LO gain 394.4

0

50

100

260 270 280 Hut 2.8.4

HI gain 0.0 LO gain 409.8

0

50

260 280 300 320

Hut 2.8.5

HI gain 0.0 LO gain 492.6

0

50

100

260 270 280 290 Hut 2.8.6

HI gain 0.0 LO gain 446.6

0

50

100

260 280 300

Hut 2.8.7

HI gain 0.0 LO gain 469.1

0

50

260 270 280 Hut 2.8.8

HI gain 0.0 LO gain 423.1

0

50

260 280 300 320 340 Hut 2.8.9

HI gain 0.0 LO gain 542.9

0 50 100

450 500 550 Hut 2.8.10

HI gain 473.4 LO gain 501.9

Pedestals Calib 8560.1

0

50

260 270 280 290 Hut 2.9.3

HI gain 0.0 LO gain 436.8

0

50

100

260 280 300 Hut 2.9.4

HI gain 0.0 LO gain 487.6

0

50

100

252 254 256 258 Hut 2.9.5

HI gain 0.0 LO gain 366.8

0

50

260 280 300 Hut 2.9.6

HI gain 0.0 LO gain 475.6

0 25 50

255 260 265

Hut 2.9.7

HI gain 0.0 LO gain 387.7

0

50

100

260 270 280 Hut 2.9.8

HI gain 0.0 LO gain 417.8

0

50

350 400 450 Hut 2.9.9

HI gain 413.6 LO gain 343.6

0

50

100

350 400 450 Hut 2.10.4

HI gain 361.6 LO gain 433.0

0

50

450 500 550 Hut 2.10.5

HI gain 441.0 LO gain 519.4

0

50

100

400 450 500 Hut 2.10.6

HI gain 432.2 LO gain 443.5

Pedestals Calib 8560.1

0

100

350 400 450 Hut 2.10.7

HI gain 427.2 LO gain 415.5

0 50 100

350 400 450 Hut 2.10.8

HI gain 431.0 LO gain 374.8

0 50 100

400 450 500 Hut 2.10.9

HI gain 470.5 LO gain 459.0

0

50

300 350 400 Hut 2.11.3

HI gain 346.1 LO gain 386.8

0

50

400 450 500

Hut 2.11.4

HI gain 425.0 LO gain 477.0

0

50

300 350 400 Hut 2.11.5

HI gain 423.9 LO gain 253.8

0

50

400 450 500 Hut 2.11.6

HI gain 461.7 LO gain 415.7

-1

0

1

260 280 300 320 Hut 2.11.7

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320

Hut 2.11.8

HI gain 0.0 LO gain 0.0

0

50

300 350 400 Hut 2.12.3

HI gain 384.7 LO gain 349.8

Pedestals Calib 8560.1

0

50

450 500 550 Hut 2.12.4

HI gain 467.2 LO gain 509.2

0

50

350 400 450 Hut 2.12.5

HI gain 387.1 LO gain 458.4

0

50

350 400 450 Hut 2.12.6

HI gain 397.5 LO gain 398.0

0 50 100

260 270 280 Hut 2.12.7

HI gain 0.0 LO gain 413.9

-1

0

1

260 280 300 320

Hut 2.12.8

HI gain 0.0 LO gain 0.0

0

50

400 450 500 Hut 2.13.3

HI gain 387.0 LO gain 538.3

0

50

100

450 500 550 Hut 2.13.4

HI gain 446.1 LO gain 537.0

0

50

400 450 500 550 Hut 2.13.5

HI gain 417.3 LO gain 532.0

0

100

400 450 500 Hut 2.13.6

HI gain 347.5 LO gain 503.7

0

50

100

300 350 400 Hut 2.13.7

HI gain 395.1 LO gain 338.6

Pedestals Calib 8560.1

0 50 100

350 400 450 Hut 2.13.8

HI gain 413.6 LO gain 430.6

0

50

100

350 400 450 Hut 2.14.3

HI gain 360.2 LO gain 420.3

0

50

100

400 450 500 Hut 2.14.4

HI gain 481.4 LO gain 459.6

0

50

300 350 400 Hut 2.14.5

HI gain 274.4 LO gain 395.8

0 20 40

400 450 500 Hut 2.14.6

HI gain 500.5 LO gain 426.7

0

50

300 350 400 Hut 2.14.7

HI gain 326.8 LO gain 391.9

0 50 100

350 400 450 Hut 2.14.8

HI gain 365.1 LO gain 388.4

LP calibrations Calib 8560.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1077. 14.73

Hut 2.3.3 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1077. 14.73

Hut 2.3.3

Hut 2.3.3 TDC counts

Events

HImean = 3468.1 LOmean = 3444.9

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1331. 13.84

Hut 2.3.4 TDC counts

Events

0

100

200

1300 1350 1400

Entries Mean RMS 800 1331. 13.84

Hut 2.3.4

Hut 2.3.4 TDC counts

Events

HImean = 3602.5 LOmean = 3640.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1069. 2.002

Hut 2.3.5 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1069. 2.002

Hut 2.3.5

Hut 2.3.5 TDC counts

Events

HImean = 3673.2 LOmean = 3583.7

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1054. 1.602

Hut 2.3.6 TDC counts

Events

0

100

200

1050 1100 1150

Entries Mean RMS 800 1054. 1.602

Hut 2.3.6

Hut 2.3.6 TDC counts

Events

HImean = 3547.6 LOmean = 3062.7

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1022. 188.6

Hut 2.3.7 TDC counts

Events

0

100

200

1000 1050 1100

Entries Mean RMS 800 1022. 188.6

Hut 2.3.7

Hut 2.3.7 TDC counts

Events

HImean = 3411.4 LOmean = 3144.2

LP calibrations Calib 8560.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1147. 1.753

Hut 2.3.8 TDC counts

Events

0

100

200

1100 1150 1200

Entries Mean RMS 800 1147. 1.753

Hut 2.3.8

Hut 2.3.8 TDC counts

Events

HImean = 3650.5 LOmean = 3334.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1550. 93.67

Hut 2.3.9 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1550. 93.67

Hut 2.3.9

Hut 2.3.9 TDC counts

Events

HImean = 3360.5 LOmean = 3364.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2221. 71.06

Hut 2.3.10 TDC counts

Events

0

100

2200 2250 2300

Entries Mean RMS 800 2221. 71.06

Hut 2.3.10

Hut 2.3.10 TDC counts

Events

HImean = 1229.1 LOmean = 1183.0

0 250 500

0 1000 2000 3000 4000

Entries Mean RMS 800 3347. 1376.

Hut 2.3.11 TDC counts

Events

-1

0

1

3500 3550 3600

Entries Mean RMS 800 3347. 1376.

Hut 2.3.11

Hut 2.3.11 TDC counts

Events

HImean = 2617.3 LOmean = 2547.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 945.1 2.257

Hut 2.3.12 TDC counts

Events

0

100

200

900 950 1000

Entries Mean RMS 800 945.1 2.257

Hut 2.3.12

Hut 2.3.12 TDC counts

Events

HImean = 4088.7 LOmean = 3138.3

LP calibrations Calib 8560.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 715.5 121.8

Hut 2.3.13 TDC counts

Events

0

100

200

700 750 800

Entries Mean RMS 800 715.5 121.8

Hut 2.3.13

Hut 2.3.13 TDC counts

Events

HImean = 3152.6 LOmean = 2600.3

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 819.1 3.110

Hut 2.3.14 TDC counts

Events

0 50 100

800 850 900

Entries Mean RMS 800 819.1 3.110

Hut 2.3.14

Hut 2.3.14 TDC counts

Events

HImean = 3795.7 LOmean = 2763.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1133. 1.959

Hut 2.4.3 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1133. 1.959

Hut 2.4.3

Hut 2.4.3 TDC counts

Events

HImean = 3262.2 LOmean = 3415.3

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1442. 3.047

Hut 2.4.4 TDC counts

Events

0

100

200

1400 1450 1500

Entries Mean RMS 800 1442. 3.047

Hut 2.4.4

Hut 2.4.4 TDC counts

Events

HImean = 3491.1 LOmean = 3497.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1352. 97.79

Hut 2.4.5 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1352. 97.79

Hut 2.4.5

Hut 2.4.5 TDC counts

Events

HImean = 3657.7 LOmean = 3513.5

LP calibrations Calib 8560.1

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.6 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.6

Hut 2.4.6 TDC counts

Events

HImean = 2586.6 LOmean = 2557.9

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.7 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.7

Hut 2.4.7 TDC counts

Events

HImean = 2498.2 LOmean = 2562.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1035. 12.86

Hut 2.4.8 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1035. 12.86

Hut 2.4.8

Hut 2.4.8 TDC counts

Events

HImean = 3348.9 LOmean = 3568.7

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1057. 107.5

Hut 2.4.9 TDC counts

Events

0

100

200

1050 1100 1150

Entries Mean RMS 800 1057. 107.5

Hut 2.4.9

Hut 2.4.9 TDC counts

Events

HImean = 4005.4 LOmean = 3649.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 716.6 119.5

Hut 2.4.10 TDC counts

Events

0

100

700 750 800

Entries Mean RMS 800 716.6 119.5

Hut 2.4.10

Hut 2.4.10 TDC counts

Events

HImean = 1105.5 LOmean = 1411.8

LP calibrations Calib 8560.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 663.0 13.45

Hut 2.4.11 TDC counts

Events

0

100

200

650 700 750

Entries Mean RMS 800 663.0 13.45

Hut 2.4.11

Hut 2.4.11 TDC counts

Events

HImean = 2756.3 LOmean = 2615.5

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4084. 167.3

Hut 2.4.12 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4084. 167.3

Hut 2.4.12

Hut 2.4.12 TDC counts

Events

HImean = 2539.1 LOmean = 2622.3

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 796.3 9.783

Hut 2.4.13 TDC counts

Events

0

100

200

750 800 850

Entries Mean RMS 800 796.3 9.783

Hut 2.4.13

Hut 2.4.13 TDC counts

Events

HImean = 3821.0 LOmean = 4095.5

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1058. 1.852

Hut 2.4.14 TDC counts

Events

0

100

200

1050 1100 1150

Entries Mean RMS 800 1058. 1.852

Hut 2.4.14

Hut 2.4.14 TDC counts

Events

HImean = 3711.2 LOmean = 3582.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1139. 152.2

Hut 2.5.3 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1139. 152.2

Hut 2.5.3

Hut 2.5.3 TDC counts

Events

HImean = 3438.3 LOmean = 3466.5

LP calibrations Calib 8560.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1329. 139.9

Hut 2.5.4 TDC counts

Events

0

100

1300 1350 1400 1450

Entries Mean RMS 800 1329. 139.9

Hut 2.5.4

Hut 2.5.4 TDC counts

Events

HImean = 3449.5 LOmean = 3450.7

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1132. 150.2

Hut 2.5.5 TDC counts

Events

0

100

200

1100 1150 1200

Entries Mean RMS 800 1132. 150.2

Hut 2.5.5

Hut 2.5.5 TDC counts

Events

HImean = 3307.8 LOmean = 1337.5

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1150. 104.2

Hut 2.5.6 TDC counts

Events

0

100

200

1100 1150 1200

Entries Mean RMS 800 1150. 104.2

Hut 2.5.6

Hut 2.5.6 TDC counts

Events

HImean = 3611.6 LOmean = 1255.8

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1155. 21.69

Hut 2.5.7 TDC counts

Events

0

100

200

1150 1200 1250

Entries Mean RMS 800 1155. 21.69

Hut 2.5.7

Hut 2.5.7 TDC counts

Events

HImean = 3338.2 LOmean = 1001.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1068. 109.4

Hut 2.5.8 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1068. 109.4

Hut 2.5.8

Hut 2.5.8 TDC counts

Events

HImean = 3301.4 LOmean = 1232.4

LP calibrations Calib 8560.1

0

50

0 1000 2000 3000 4000

Entries Mean RMS 800 2218. 1142.

Hut 2.5.9 TDC counts

Events

-1

0

1

2250 2300 2350

Entries Mean RMS 800 2218. 1142.

Hut 2.5.9

Hut 2.5.9 TDC counts

Events

HImean = 3347.8 LOmean = 4095.5

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 738.0 1.747

Hut 2.5.10 TDC counts

Events

0

100

200

700 750 800

Entries Mean RMS 800 738.0 1.747

Hut 2.5.10

Hut 2.5.10 TDC counts

Events

HImean = 932.2 LOmean = 1227.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1368. 3.132

Hut 2.6.3 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1368. 3.132

Hut 2.6.3

Hut 2.6.3 TDC counts

Events

HImean = 3402.6 LOmean = 1254.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 855.4 7.035

Hut 2.6.4 TDC counts

Events

0

100

200

850 900 950

Entries Mean RMS 800 855.4 7.035

Hut 2.6.4

Hut 2.6.4 TDC counts

Events

HImean = 3337.9 LOmean = 1368.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1062. 2.567

Hut 2.6.5 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1062. 2.567

Hut 2.6.5

Hut 2.6.5 TDC counts

Events

HImean = 3261.1 LOmean = 1039.9

LP calibrations Calib 8560.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1017. 1.877

Hut 2.6.6 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1017. 1.877

Hut 2.6.6

Hut 2.6.6 TDC counts

Events

HImean = 3189.8 LOmean = 1095.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1169. 104.0

Hut 2.6.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1169. 104.0

Hut 2.6.7

Hut 2.6.7 TDC counts

Events

HImean = 3447.8 LOmean = 1151.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1233. 1.918

Hut 2.6.8 TDC counts

Events

0

100

1200 1250 1300

Entries Mean RMS 800 1233. 1.918

Hut 2.6.8

Hut 2.6.8 TDC counts

Events

HImean = 3488.3 LOmean = 1140.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1108. 1.824

Hut 2.6.9 TDC counts

Events

0

100

200

1100 1150 1200

Entries Mean RMS 800 1108. 1.824

Hut 2.6.9

Hut 2.6.9 TDC counts

Events

HImean = 3190.7 LOmean = 1205.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1636. 87.03

Hut 2.6.10 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1636. 87.03

Hut 2.6.10

Hut 2.6.10 TDC counts

Events

HImean = 1180.2 LOmean = 1398.7

LP calibrations Calib 8560.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1095. 151.1

Hut 2.6.13 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1095. 151.1

Hut 2.6.13

Hut 2.6.13 TDC counts

Events

HImean = 3699.8 LOmean = 2970.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 867.4 1.989

Hut 2.6.14 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 867.4 1.989

Hut 2.6.14

Hut 2.6.14 TDC counts

Events

HImean = 3697.4 LOmean = 2817.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1433. 94.22

Hut 2.7.3 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1433. 94.22

Hut 2.7.3

Hut 2.7.3 TDC counts

Events

HImean = 3526.8 LOmean = 1144.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1562. 5.543

Hut 2.7.4 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1562. 5.543

Hut 2.7.4

Hut 2.7.4 TDC counts

Events

HImean = 3520.3 LOmean = 1220.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1065. 1.859

Hut 2.7.5 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1065. 1.859

Hut 2.7.5

Hut 2.7.5 TDC counts

Events

HImean = 3346.4 LOmean = 1140.6

LP calibrations Calib 8560.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1419. 1.857

Hut 2.7.6 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1419. 1.857

Hut 2.7.6

Hut 2.7.6 TDC counts

Events

HImean = 3167.2 LOmean = 1225.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1186. 11.70

Hut 2.7.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1186. 11.70

Hut 2.7.7

Hut 2.7.7 TDC counts

Events

HImean = 3386.8 LOmean = 1205.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1580. 89.01

Hut 2.7.8 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1580. 89.01

Hut 2.7.8

Hut 2.7.8 TDC counts

Events

HImean = 3531.8 LOmean = 4095.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1288. 102.0

Hut 2.7.9 TDC counts

Events

0

100

1250 1300 1350

Entries Mean RMS 800 1288. 102.0

Hut 2.7.9

Hut 2.7.9 TDC counts

Events

HImean = 3429.4 LOmean = 1485.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1470. 93.36

Hut 2.7.10 TDC counts

Events

0

100

1450 1500 1550

Entries Mean RMS 800 1470. 93.36

Hut 2.7.10

Hut 2.7.10 TDC counts

Events

HImean = 1103.0 LOmean = 1143.0

LP calibrations Calib 8560.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 800.8 1.711

Hut 2.7.13 TDC counts

Events

0

100

200

800 850 900

Entries Mean RMS 800 800.8 1.711

Hut 2.7.13

Hut 2.7.13 TDC counts

Events

HImean = 4051.3 LOmean = 2802.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 897.6 1.795

Hut 2.7.14 TDC counts

Events

0

100

200

850 900 950

Entries Mean RMS 800 897.6 1.795

Hut 2.7.14

Hut 2.7.14 TDC counts

Events

HImean = 3632.3 LOmean = 2993.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1109. 7.056

Hut 2.8.3 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1109. 7.056

Hut 2.8.3

Hut 2.8.3 TDC counts

Events

HImean = 3424.6 LOmean = 1158.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1105. 2.083

Hut 2.8.4 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1105. 2.083

Hut 2.8.4

Hut 2.8.4 TDC counts

Events

HImean = 3371.8 LOmean = 841.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1346. 2.022

Hut 2.8.5 TDC counts

Events

0

100

1300 1350 1400

Entries Mean RMS 800 1346. 2.022

Hut 2.8.5

Hut 2.8.5 TDC counts

Events

HImean = 3822.4 LOmean = 909.9

LP calibrations Calib 8560.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1224. 10.09

Hut 2.8.6 TDC counts

Events

0

100

200

1200 1250 1300

Entries Mean RMS 800 1224. 10.09

Hut 2.8.6

Hut 2.8.6 TDC counts

Events

HImean = 3454.3 LOmean = 3811.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 898.8 121.1

Hut 2.8.7 TDC counts

Events

0

100

900 950 1000

Entries Mean RMS 800 898.8 121.1

Hut 2.8.7

Hut 2.8.7 TDC counts

Events

HImean = 3471.7 LOmean = 1233.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1183. 103.4

Hut 2.8.8 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1183. 103.4

Hut 2.8.8

Hut 2.8.8 TDC counts

Events

HImean = 3329.5 LOmean = 1112.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1091. 106.3

Hut 2.8.9 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1091. 106.3

Hut 2.8.9

Hut 2.8.9 TDC counts

Events

HImean = 3564.3 LOmean = 1373.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2191. 35.66

Hut 2.8.10 TDC counts

Events

0

100

2150 2200 2250

Entries Mean RMS 800 2191. 35.66

Hut 2.8.10

Hut 2.8.10 TDC counts

Events

HImean = 468.2 LOmean = 637.4

LP calibrations Calib 8560.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1038. 108.2

Hut 2.9.3 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1038. 108.2

Hut 2.9.3

Hut 2.9.3 TDC counts

Events

HImean = 3384.1 LOmean = 1203.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1294. 99.29

Hut 2.9.4 TDC counts

Events

0

100

1250 1300 1350

Entries Mean RMS 800 1294. 99.29

Hut 2.9.4

Hut 2.9.4 TDC counts

Events

HImean = 3323.1 LOmean = 1113.0

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1123. 1.908

Hut 2.9.5 TDC counts

Events

0

100

200

1100 1150 1200

Entries Mean RMS 800 1123. 1.908

Hut 2.9.5

Hut 2.9.5 TDC counts

Events

HImean = 3381.4 LOmean = 2405.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1376. 2.140

Hut 2.9.6 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1376. 2.140

Hut 2.9.6

Hut 2.9.6 TDC counts

Events

HImean = 3523.1 LOmean = 740.4

0

200

400

0 1000 2000 3000 4000

Entries Mean RMS 800 3039. 1021.

Hut 2.9.7 TDC counts

Events

-1

0

1

2950 3000 3050

Entries Mean RMS 800 3039. 1021.

Hut 2.9.7

Hut 2.9.7 TDC counts

Events

HImean = 2579.4 LOmean = 382.9

LP calibrations Calib 8560.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 972.2 156.4

Hut 2.9.8 TDC counts

Events

0

100

950 1000 1050

Entries Mean RMS 800 972.2 156.4

Hut 2.9.8

Hut 2.9.8 TDC counts

Events

HImean = 3591.1 LOmean = 1645.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1398. 2.371

Hut 2.9.9 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1398. 2.371

Hut 2.9.9

Hut 2.9.9 TDC counts

Events

HImean = 1403.8 LOmean = 1175.9

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.10.4 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.10.4

Hut 2.10.4 TDC counts

Events

HImean = 364.2 LOmean = 437.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1013. 155.4

Hut 2.10.5 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1013. 155.4

Hut 2.10.5

Hut 2.10.5 TDC counts

Events

HImean = 1228.3 LOmean = 1242.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 893.6 113.3

Hut 2.10.6 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 893.6 113.3

Hut 2.10.6

Hut 2.10.6 TDC counts

Events

HImean = 1356.6 LOmean = 1284.6

LP calibrations Calib 8560.1

0 250 500

0 1000 2000 3000 4000

Entries Mean RMS 800 3260. 1448.

Hut 2.10.7 TDC counts

Events

0 250 500

4060 4080 4100

Entries Mean RMS 800 3260. 1448.

Hut 2.10.7

Hut 2.10.7 TDC counts

Events

HImean = 497.9 LOmean = 675.0

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4086. 128.6

Hut 2.10.8 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4086. 128.6

Hut 2.10.8

Hut 2.10.8 TDC counts

Events

HImean = 441.1 LOmean = 389.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2080. 2.084

Hut 2.10.9 TDC counts

Events

0

100

2050 2100 2150

Entries Mean RMS 800 2080. 2.084

Hut 2.10.9

Hut 2.10.9 TDC counts

Events

HImean = 1326.1 LOmean = 1793.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1408. 1.974

Hut 2.11.3 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1408. 1.974

Hut 2.11.3

Hut 2.11.3 TDC counts

Events

HImean = 1306.8 LOmean = 854.6

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1211. 144.9

Hut 2.11.4 TDC counts

Events

0

100

200

1200 1250 1300

Entries Mean RMS 800 1211. 144.9

Hut 2.11.4

Hut 2.11.4 TDC counts

Events

HImean = 1316.0 LOmean = 1312.2

LP calibrations Calib 8560.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 977.6 113.9

Hut 2.11.5 TDC counts

Events

0

100

950 1000 1050

Entries Mean RMS 800 977.6 113.9

Hut 2.11.5

Hut 2.11.5 TDC counts

Events

HImean = 955.8 LOmean = 965.9

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 755.3 7.152

Hut 2.11.6 TDC counts

Events

0

50

100

700 750 800 850

Entries Mean RMS 800 755.3 7.152

Hut 2.11.6

Hut 2.11.6 TDC counts

Events

HImean = 1355.5 LOmean = 919.1

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 703.3 2.866

Hut 2.11.7 TDC counts

Events

0 50 100

700 750 800

Entries Mean RMS 800 703.3 2.866

Hut 2.11.7

Hut 2.11.7 TDC counts

Events

HImean = 3269.1 LOmean = 2688.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 860.1 2.251

Hut 2.11.8 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 860.1 2.251

Hut 2.11.8

Hut 2.11.8 TDC counts

Events

HImean = 3604.3 LOmean = 2845.9

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4069. 254.6

Hut 2.12.3 TDC counts

Events

0

500

4000 4025 4050 4075 4100

Entries Mean RMS 800 4069. 254.6

Hut 2.12.3

Hut 2.12.3 TDC counts

Events

HImean = 371.9 LOmean = 356.7

LP calibrations Calib 8560.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 821.4 164.2

Hut 2.12.4 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 821.4 164.2

Hut 2.12.4

Hut 2.12.4 TDC counts

Events

HImean = 1315.7 LOmean = 1339.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 792.5 234.4

Hut 2.12.5 TDC counts

Events

0

100

750 800 850

Entries Mean RMS 800 792.5 234.4

Hut 2.12.5

Hut 2.12.5 TDC counts

Events

HImean = 1333.5 LOmean = 1203.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1110. 8.125

Hut 2.12.6 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1110. 8.125

Hut 2.12.6

Hut 2.12.6 TDC counts

Events

HImean = 1159.4 LOmean = 1258.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 664.1 31.68

Hut 2.12.7 TDC counts

Events

0

100

650 700 750

Entries Mean RMS 800 664.1 31.68

Hut 2.12.7

Hut 2.12.7 TDC counts

Events

HImean = 3934.1 LOmean = 593.9

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 884.6 6.108

Hut 2.12.8 TDC counts

Events

0

100

200

850 900 950

Entries Mean RMS 800 884.6 6.108

Hut 2.12.8

Hut 2.12.8 TDC counts

Events

HImean = 3728.8 LOmean = 2670.7

LP calibrations Calib 8560.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 807.4 3.257

Hut 2.13.3 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 807.4 3.257

Hut 2.13.3

Hut 2.13.3 TDC counts

Events

HImean = 1275.6 LOmean = 1381.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1519. 91.79

Hut 2.13.4 TDC counts

Events

0

100

1500 1550 1600

Entries Mean RMS 800 1519. 91.79

Hut 2.13.4

Hut 2.13.4 TDC counts

Events

HImean = 1309.2 LOmean = 1394.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 635.0 123.9

Hut 2.13.5 TDC counts

Events

0

100

600 650 700

Entries Mean RMS 800 635.0 123.9

Hut 2.13.5

Hut 2.13.5 TDC counts

Events

HImean = 1343.0 LOmean = 1291.9

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 819.5 1.720

Hut 2.13.6 TDC counts

Events

0

100

200

800 850 900

Entries Mean RMS 800 819.5 1.720

Hut 2.13.6

Hut 2.13.6 TDC counts

Events

HImean = 1302.5 LOmean = 1120.7

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1199. 105.5

Hut 2.13.7 TDC counts

Events

0

100

200

1150 1200 1250

Entries Mean RMS 800 1199. 105.5

Hut 2.13.7

Hut 2.13.7 TDC counts

Events

HImean = 545.6 LOmean = 348.0

LP calibrations Calib 8560.1

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 971.0 5.461

Hut 2.13.8 TDC counts

Events

0

50

100

950 1000 1050

Entries Mean RMS 800 971.0 5.461

Hut 2.13.8

Hut 2.13.8 TDC counts

Events

HImean = 1138.3 LOmean = 529.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 943.7 1.977

Hut 2.14.3 TDC counts

Events

0

100

900 950 1000

Entries Mean RMS 800 943.7 1.977

Hut 2.14.3

Hut 2.14.3 TDC counts

Events

HImean = 1199.9 LOmean = 1181.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1024. 27.53

Hut 2.14.4 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1024. 27.53

Hut 2.14.4

Hut 2.14.4 TDC counts

Events

HImean = 1595.1 LOmean = 1759.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 885.4 15.07

Hut 2.14.5 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 885.4 15.07

Hut 2.14.5

Hut 2.14.5 TDC counts

Events

HImean = 1141.9 LOmean = 3307.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 944.0 2.845

Hut 2.14.6 TDC counts

Events

0

100

900 950 1000

Entries Mean RMS 800 944.0 2.845

Hut 2.14.6

Hut 2.14.6 TDC counts

Events

HImean = 1379.3 LOmean = 1824.3

LP calibrations Calib 8560.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1186. 67.75

Hut 2.14.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1186. 67.75

Hut 2.14.7

Hut 2.14.7 TDC counts

Events

HImean = 1483.1 LOmean = 2767.0

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1157. 104.3

Hut 2.14.8 TDC counts

Events

0

50

100

1150 1200 1250

Entries Mean RMS 800 1157. 104.3

Hut 2.14.8

Hut 2.14.8 TDC counts

Events

HImean = 1123.7 LOmean = 483.1

TDC calibrations Calib 8560.1

0 2000

4000

10 20 30

0.1494E+07/ 16 P1 660.8 P2 118.0

icalid

(TDC counts)

Hut 2.3.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.3

Hut 2.3.3 icalid

Δfit (TDC counts)

0.211832 ns/TDCcount

0 2500

5000

10 20 30

13.50 / 14 P1 474.3 P2 156.0

icalid

(TDC counts)

Hut 2.3.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.4

Hut 2.3.4 icalid

Δfit (TDC counts)

0.16027 ns/TDCcount

0 2500

5000

10 20 30

11.41 / 15 P1 231.6 P2 155.7

icalid

(TDC counts)

Hut 2.3.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.5

Hut 2.3.5 icalid

Δfit (TDC counts)

0.160607 ns/TDCcount

0 2500

5000

10 20 30

8.801 / 14 P1 211.0 P2 152.0

icalid

(TDC counts)

Hut 2.3.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.6

Hut 2.3.6 icalid

Δfit (TDC counts)

0.164504 ns/TDCcount

0 2500

5000

10 20 30

16.05 / 14 P1 187.2 P2 157.0

icalid

(TDC counts)

Hut 2.3.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.7

Hut 2.3.7 icalid

Δfit (TDC counts)

0.159223 ns/TDCcount

TDC calibrations Calib 8560.1

0 2500

5000

10 20 30

14.23 / 14 P1 298.2 P2 157.3

icalid

(TDC counts)

Hut 2.3.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.8

Hut 2.3.8 icalid

Δfit (TDC counts)

0.158926 ns/TDCcount

0 2000

4000

10 20 30

16.22 / 15 P1 33.62 P2 150.5

icalid

(TDC counts)

Hut 2.3.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.9

Hut 2.3.9 icalid

Δfit (TDC counts)

0.166104 ns/TDCcount

0 2500

5000

10 20 30

7461. / 15 P1 447.6 P2 149.2

icalid

(TDC counts)

Hut 2.3.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.10

Hut 2.3.10 icalid

Δfit (TDC counts)

0.167538 ns/TDCcount

0

2000

4000

10 20 30

0.4547E+07/ 16 P1 855.4 P2 82.57

icalid

(TDC counts)

Hut 2.3.11

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.11

Hut 2.3.11 icalid

Δfit (TDC counts)

0.302789 ns/TDCcount

0

2500

5000

10 20 30

12.27 / 15 P1 169.5 P2 150.7

icalid

(TDC counts)

Hut 2.3.12

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.12

Hut 2.3.12 icalid

Δfit (TDC counts)

0.165886 ns/TDCcount

TDC calibrations Calib 8560.1

0 2000

4000

10 20 30

20.84 / 14 P1 -103.3 P2 150.5

icalid

(TDC counts)

Hut 2.3.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.13

Hut 2.3.13 icalid

Δfit (TDC counts)

0.166125 ns/TDCcount

0 2000

4000

10 20 30

15.41 / 15 P1 55.95 P2 149.0

icalid

(TDC counts)

Hut 2.3.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.14

Hut 2.3.14 icalid

Δfit (TDC counts)

0.167776 ns/TDCcount

0 2500

5000

10 20 30

15.36 / 14 P1 299.5 P2 153.8

icalid

(TDC counts)

Hut 2.4.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.3

Hut 2.4.3 icalid

Δfit (TDC counts)

0.162498 ns/TDCcount

0 2500

5000

10 20 30

4.564 / 14 P1 489.0 P2 158.4

icalid

(TDC counts)

Hut 2.4.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.4

Hut 2.4.4 icalid

Δfit (TDC counts)

0.157874 ns/TDCcount

0 2500

5000

10 20 30

9.315 / 14 P1 478.6 P2 157.8

icalid

(TDC counts)

Hut 2.4.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.5

Hut 2.4.5 icalid

Δfit (TDC counts)

0.158384 ns/TDCcount

TDC calibrations Calib 8560.1

0 2500

5000

10 20 30

5.262 / 13 P1 499.2 P2 157.9

icalid

(TDC counts)

Hut 2.4.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.6

Hut 2.4.6 icalid

Δfit (TDC counts)

0.158316 ns/TDCcount

0 2500

5000

10 20 30

9.778 / 13 P1 355.0 P2 158.2

icalid

(TDC counts)

Hut 2.4.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.7

Hut 2.4.7 icalid

Δfit (TDC counts)

0.157985 ns/TDCcount

0 2500

5000

10 20 30

193.1 / 14 P1 293.3 P2 157.4

icalid

(TDC counts)

Hut 2.4.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.8

Hut 2.4.8 icalid

Δfit (TDC counts)

0.15881 ns/TDCcount

0 2500

5000

10 20 30

8.309 / 14 P1 339.2 P2 157.1

icalid

(TDC counts)

Hut 2.4.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.9

Hut 2.4.9 icalid

Δfit (TDC counts)

0.159113 ns/TDCcount

0 2000

4000

10 20 30

17.56 / 14 P1 19.22 P2 151.5

icalid

(TDC counts)

Hut 2.4.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.10

Hut 2.4.10 icalid

Δfit (TDC counts)

0.164994 ns/TDCcount

TDC calibrations Calib 8560.1

0 2000

4000

10 20 30

18.64 / 14 P1 -120.9 P2 152.4

icalid

(TDC counts)

Hut 2.4.11

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.11

Hut 2.4.11 icalid

Δfit (TDC counts)

0.164043 ns/TDCcount

0 2000

4000

10 20 30

18.24 / 15 P1 101.8 P2 150.4

icalid

(TDC counts)

Hut 2.4.12

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.12

Hut 2.4.12 icalid

Δfit (TDC counts)

0.166226 ns/TDCcount

0 2000

4000

10 20 30

18.55 / 15 P1 18.08 P2 149.8

icalid

(TDC counts)

Hut 2.4.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.13

Hut 2.4.13 icalid

Δfit (TDC counts)

0.166867 ns/TDCcount

0

2500

5000

10 20 30

19.65 / 15 P1 248.5 P2 150.0

icalid

(TDC counts)

Hut 2.4.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.14

Hut 2.4.14 icalid

Δfit (TDC counts)

0.166674 ns/TDCcount

0 2500

5000

10 20 30

8.015 / 14 P1 265.0 P2 157.2

icalid

(TDC counts)

Hut 2.5.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.3

Hut 2.5.3 icalid

Δfit (TDC counts)

0.159067 ns/TDCcount

TDC calibrations Calib 8560.1

0 2500

5000

10 20 30

11.63 / 14 P1 463.5 P2 157.6

icalid

(TDC counts)

Hut 2.5.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.4

Hut 2.5.4 icalid

Δfit (TDC counts)

0.15858 ns/TDCcount

0 2500

5000

10 20 30

10.74 / 15 P1 230.9 P2 155.5

icalid

(TDC counts)

Hut 2.5.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.5

Hut 2.5.5 icalid

Δfit (TDC counts)

0.1608 ns/TDCcount

0 2500

5000

10 20 30

14.99 / 15 P1 253.4 P2 154.6

icalid

(TDC counts)

Hut 2.5.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.6

Hut 2.5.6 icalid

Δfit (TDC counts)

0.161737 ns/TDCcount

0 2000

4000

10 20 30

0.3007E+07/ 15 P1 780.9 P2 106.1

icalid

(TDC counts)

Hut 2.5.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.7

Hut 2.5.7 icalid

Δfit (TDC counts)

0.235529 ns/TDCcount

0 2500

5000

10 20 30

7.209 / 14 P1 296.4 P2 155.6

icalid

(TDC counts)

Hut 2.5.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.8

Hut 2.5.8 icalid

Δfit (TDC counts)

0.160652 ns/TDCcount

TDC calibrations Calib 8560.1

0

2000

10 20 30

0.4708E+07/ 28 P1 1653. P2 17.76

icalid

(TDC counts)

Hut 2.5.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.9

Hut 2.5.9 icalid

Δfit (TDC counts)

1.40726 ns/TDCcount

0 2000

4000

10 20 30

10.74 / 14 P1 33.40 P2 151.2

icalid

(TDC counts)

Hut 2.5.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.10

Hut 2.5.10 icalid

Δfit (TDC counts)

0.165385 ns/TDCcount

0 2500

5000

10 20 30

15.86 / 14 P1 508.2 P2 152.5

icalid

(TDC counts)

Hut 2.6.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.3

Hut 2.6.3 icalid

Δfit (TDC counts)

0.163926 ns/TDCcount

0 2000

4000

10 20 30

13.56 / 15 P1 -44.54 P2 152.2

icalid

(TDC counts)

Hut 2.6.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.4

Hut 2.6.4 icalid

Δfit (TDC counts)

0.164276 ns/TDCcount

0

2000

4000

10 20 30

0.7523E+07/ 16 P1 1152. P2 74.32

icalid

(TDC counts)

Hut 2.6.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.5

Hut 2.6.5 icalid

Δfit (TDC counts)

0.336369 ns/TDCcount

TDC calibrations Calib 8560.1

0 2500

5000

10 20 30

11.92 / 14 P1 176.2 P2 154.2

icalid

(TDC counts)

Hut 2.6.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.6

Hut 2.6.6 icalid

Δfit (TDC counts)

0.16209 ns/TDCcount

0 2500

5000

10 20 30

17.26 / 14 P1 323.0 P2 153.7

icalid

(TDC counts)

Hut 2.6.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.7

Hut 2.6.7 icalid

Δfit (TDC counts)

0.162663 ns/TDCcount

0 2500

5000

10 20 30

17.80 / 15 P1 418.4 P2 154.0

icalid

(TDC counts)

Hut 2.6.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.8

Hut 2.6.8 icalid

Δfit (TDC counts)

0.162361 ns/TDCcount

0 2500

5000

10 20 30

22.80 / 14 P1 355.1 P2 154.8

icalid

(TDC counts)

Hut 2.6.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.9

Hut 2.6.9 icalid

Δfit (TDC counts)

0.161483 ns/TDCcount

0 2500

5000

10 20 30

4.717 / 14 P1 787.4 P2 154.1

icalid

(TDC counts)

Hut 2.6.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.10

Hut 2.6.10 icalid

Δfit (TDC counts)

0.162264 ns/TDCcount

TDC calibrations Calib 8560.1

0 2500

5000

10 20 30

10.89 / 15 P1 309.0 P2 151.6

icalid

(TDC counts)

Hut 2.6.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.13

Hut 2.6.13 icalid

Δfit (TDC counts)

0.16489 ns/TDCcount

0

2500

5000

10 20 30

13.62 / 15 P1 122.0 P2 151.3

icalid

(TDC counts)

Hut 2.6.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.14

Hut 2.6.14 icalid

Δfit (TDC counts)

0.16527 ns/TDCcount

0 2500

5000

10 20 30

7.813 / 14 P1 552.7 P2 155.5

icalid

(TDC counts)

Hut 2.7.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.3

Hut 2.7.3 icalid

Δfit (TDC counts)

0.160768 ns/TDCcount

0 2500

5000

10 20 30

4.315 / 14 P1 687.1 P2 155.6

icalid

(TDC counts)

Hut 2.7.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.4

Hut 2.7.4 icalid

Δfit (TDC counts)

0.160703 ns/TDCcount

0 2500

5000

10 20 30

9.447 / 14 P1 318.9 P2 155.9

icalid

(TDC counts)

Hut 2.7.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.5

Hut 2.7.5 icalid

Δfit (TDC counts)

0.160319 ns/TDCcount

TDC calibrations Calib 8560.1

0 2500

5000

10 20 30

15.11 / 15 P1 533.3 P2 155.7

icalid

(TDC counts)

Hut 2.7.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.6

Hut 2.7.6 icalid

Δfit (TDC counts)

0.160553 ns/TDCcount

0 2500

5000

10 20 30

9.297 / 14 P1 365.8 P2 156.0

icalid

(TDC counts)

Hut 2.7.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.7

Hut 2.7.7 icalid

Δfit (TDC counts)

0.160242 ns/TDCcount

0 2000

4000

10 20 30

0.1009E+07/ 15 P1 880.8 P2 119.4

icalid

(TDC counts)

Hut 2.7.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.8

Hut 2.7.8 icalid

Δfit (TDC counts)

0.209356 ns/TDCcount

0

2500

5000

10 20 30

0.1505E+06/ 15 P1 280.7 P2 148.5

icalid

(TDC counts)

Hut 2.7.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.9

Hut 2.7.9 icalid

Δfit (TDC counts)

0.16835 ns/TDCcount

0 2000

4000

10 20 30

12.19 / 14 P1 95.33 P2 150.5

icalid

(TDC counts)

Hut 2.7.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.10

Hut 2.7.10 icalid

Δfit (TDC counts)

0.166139 ns/TDCcount

TDC calibrations Calib 8560.1

0 2000

4000

10 20 30

14.78 / 14 P1 73.51 P2 150.7

icalid

(TDC counts)

Hut 2.7.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.13

Hut 2.7.13 icalid

Δfit (TDC counts)

0.1659 ns/TDCcount

0 2000

4000

10 20 30

14.41 / 15 P1 -1.747 P2 150.1

icalid

(TDC counts)

Hut 2.7.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.14

Hut 2.7.14 icalid

Δfit (TDC counts)

0.166583 ns/TDCcount

0 2500

5000

10 20 30

9.774 / 14 P1 282.4 P2 156.7

icalid

(TDC counts)

Hut 2.8.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.3

Hut 2.8.3 icalid

Δfit (TDC counts)

0.159588 ns/TDCcount

0 2500

5000

10 20 30

13.00 / 15 P1 236.0 P2 153.1

icalid

(TDC counts)

Hut 2.8.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.4

Hut 2.8.4 icalid

Δfit (TDC counts)

0.163269 ns/TDCcount

0 2500

5000

10 20 30

13.67 / 14 P1 463.0 P2 157.0

icalid

(TDC counts)

Hut 2.8.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.5

Hut 2.8.5 icalid

Δfit (TDC counts)

0.159277 ns/TDCcount

TDC calibrations Calib 8560.1

0 2500

5000

10 20 30

9.212 / 14 P1 357.8 P2 156.5

icalid

(TDC counts)

Hut 2.8.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.6

Hut 2.8.6 icalid

Δfit (TDC counts)

0.15979 ns/TDCcount

0 2000

4000

10 20 30

0.1417E+06/ 14 P1 140.9 P2 146.1

icalid

(TDC counts)

Hut 2.8.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.7

Hut 2.8.7 icalid

Δfit (TDC counts)

0.171167 ns/TDCcount

0 2500

5000

10 20 30

15.49 / 15 P1 487.8 P2 150.6

icalid

(TDC counts)

Hut 2.8.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.8

Hut 2.8.8 icalid

Δfit (TDC counts)

0.165951 ns/TDCcount

0 2500

5000

10 20 30

13.52 / 14 P1 267.3 P2 155.5

icalid

(TDC counts)

Hut 2.8.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.9

Hut 2.8.9 icalid

Δfit (TDC counts)

0.160781 ns/TDCcount

0

2500

5000

10 20 30

11.44 / 15 P1 152.9 P2 151.7

icalid

(TDC counts)

Hut 2.8.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.10

Hut 2.8.10 icalid

Δfit (TDC counts)

0.16481 ns/TDCcount

TDC calibrations Calib 8560.1

0 2500

5000

10 20 30

17.38 / 14 P1 200.1 P2 155.8

icalid

(TDC counts)

Hut 2.9.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.3

Hut 2.9.3 icalid

Δfit (TDC counts)

0.160492 ns/TDCcount

0 2500

5000

10 20 30

9.189 / 14 P1 506.0 P2 151.0

icalid

(TDC counts)

Hut 2.9.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.4

Hut 2.9.4 icalid

Δfit (TDC counts)

0.16554 ns/TDCcount

0 2500

5000

10 20 30

21.68 / 15 P1 276.6 P2 152.6

icalid

(TDC counts)

Hut 2.9.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.5

Hut 2.9.5 icalid

Δfit (TDC counts)

0.163842 ns/TDCcount

0 2000

4000

10 20 30

0.1245E+07/ 16 P1 887.3 P2 115.0

icalid

(TDC counts)

Hut 2.9.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.6

Hut 2.9.6 icalid

Δfit (TDC counts)

0.217331 ns/TDCcount

0 2500

5000

10 20 30

10.18 / 14 P1 368.7 P2 154.1

icalid

(TDC counts)

Hut 2.9.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.7

Hut 2.9.7 icalid

Δfit (TDC counts)

0.162224 ns/TDCcount

TDC calibrations Calib 8560.1

0 2500

5000

10 20 30

11.54 / 15 P1 274.0 P2 152.3

icalid

(TDC counts)

Hut 2.9.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.8

Hut 2.9.8 icalid

Δfit (TDC counts)

0.164102 ns/TDCcount

0 2000

4000

10 20 30

11.17 / 14 P1 -76.14 P2 150.6

icalid

(TDC counts)

Hut 2.9.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.9

Hut 2.9.9 icalid

Δfit (TDC counts)

0.165981 ns/TDCcount

0 2500

5000

10 20 30

21.31 / 14 P1 313.9 P2 152.4

icalid

(TDC counts)

Hut 2.10.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.4

Hut 2.10.4 icalid

Δfit (TDC counts)

0.164024 ns/TDCcount

0 2500

5000

10 20 30

17.71 / 15 P1 273.6 P2 150.9

icalid

(TDC counts)

Hut 2.10.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.5

Hut 2.10.5 icalid

Δfit (TDC counts)

0.165663 ns/TDCcount

0

2500

5000

10 20 30

23.05 / 15 P1 153.8 P2 150.9

icalid

(TDC counts)

Hut 2.10.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.6

Hut 2.10.6 icalid

Δfit (TDC counts)

0.165684 ns/TDCcount

TDC calibrations Calib 8560.1

0 2000

4000

10 20 30

16.81 / 14 P1 87.66 P2 150.8

icalid

(TDC counts)

Hut 2.10.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.7

Hut 2.10.7 icalid

Δfit (TDC counts)

0.16582 ns/TDCcount

0 2000

4000

10 20 30

16.42 / 14 P1 47.85 P2 150.6

icalid

(TDC counts)

Hut 2.10.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.8

Hut 2.10.8 icalid

Δfit (TDC counts)

0.166004 ns/TDCcount

0

2500

5000

10 20 30

11.18 / 14 P1 200.3 P2 151.3

icalid

(TDC counts)

Hut 2.10.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.9

Hut 2.10.9 icalid

Δfit (TDC counts)

0.165227 ns/TDCcount

0 2500

5000

10 20 30

8.905 / 14 P1 636.8 P2 155.3

icalid

(TDC counts)

Hut 2.11.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.3

Hut 2.11.3 icalid

Δfit (TDC counts)

0.160952 ns/TDCcount

0 2500

5000

10 20 30

19.12 / 14 P1 470.2 P2 152.9

icalid

(TDC counts)

Hut 2.11.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.4

Hut 2.11.4 icalid

Δfit (TDC counts)

0.16355 ns/TDCcount

TDC calibrations Calib 8560.1

0 2500

5000

10 20 30

20.30 / 14 P1 283.9 P2 153.4

icalid

(TDC counts)

Hut 2.11.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.5

Hut 2.11.5 icalid

Δfit (TDC counts)

0.162978 ns/TDCcount

0 2000

4000

10 20 30

89.97 / 17 P1 103.1 P2 132.7

icalid

(TDC counts)

Hut 2.11.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.6

Hut 2.11.6 icalid

Δfit (TDC counts)

0.188347 ns/TDCcount

0 2000

4000

10 20 30

17.22 / 15 P1 -22.94 P2 150.7

icalid

(TDC counts)

Hut 2.11.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.7

Hut 2.11.7 icalid

Δfit (TDC counts)

0.165888 ns/TDCcount

0 2000

4000

10 20 30

15.19 / 14 P1 83.37 P2 150.5

icalid

(TDC counts)

Hut 2.11.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.8

Hut 2.11.8 icalid

Δfit (TDC counts)

0.166163 ns/TDCcount

0 2500

5000

10 20 30

17.26 / 14 P1 212.9 P2 152.5

icalid

(TDC counts)

Hut 2.12.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.3

Hut 2.12.3 icalid

Δfit (TDC counts)

0.163969 ns/TDCcount

TDC calibrations Calib 8560.1

0 2000

4000

10 20 30

27.09 / 15 P1 102.0 P2 151.4

icalid

(TDC counts)

Hut 2.12.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.4

Hut 2.12.4 icalid

Δfit (TDC counts)

0.165171 ns/TDCcount

0 2000

4000

10 20 30

13.62 / 14 P1 46.08 P2 151.5

icalid

(TDC counts)

Hut 2.12.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.5

Hut 2.12.5 icalid

Δfit (TDC counts)

0.164985 ns/TDCcount

0 2500

5000

10 20 30

14.25 / 15 P1 384.0 P2 154.1

icalid

(TDC counts)

Hut 2.12.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.6

Hut 2.12.6 icalid

Δfit (TDC counts)

0.162259 ns/TDCcount

0 2000

4000

10 20 30

17.62 / 14 P1 -88.14 P2 150.2

icalid

(TDC counts)

Hut 2.12.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.7

Hut 2.12.7 icalid

Δfit (TDC counts)

0.166409 ns/TDCcount

0

2500

5000

10 20 30

16.88 / 15 P1 134.6 P2 150.9

icalid

(TDC counts)

Hut 2.12.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.8

Hut 2.12.8 icalid

Δfit (TDC counts)

0.16567 ns/TDCcount

TDC calibrations Calib 8560.1

0

2500

5000

10 20 30

13.27 / 14 P1 73.00 P2 152.3

icalid

(TDC counts)

Hut 2.13.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.3

Hut 2.13.3 icalid

Δfit (TDC counts)

0.164106 ns/TDCcount

0

2000

10 20 30

0.6796E+07/ 15 P1 1643. P2 53.42

icalid

(TDC counts)

Hut 2.13.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.4

Hut 2.13.4 icalid

Δfit (TDC counts)

0.467984 ns/TDCcount

0 2000

4000

10 20 30

14.16 / 14 P1 -89.79 P2 151.9

icalid

(TDC counts)

Hut 2.13.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.5

Hut 2.13.5 icalid

Δfit (TDC counts)

0.164612 ns/TDCcount

0

2500

5000

10 20 30

15.17 / 15 P1 84.45 P2 152.6

icalid

(TDC counts)

Hut 2.13.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.6

Hut 2.13.6 icalid

Δfit (TDC counts)

0.163852 ns/TDCcount

0 2500

5000

10 20 30

10.04 / 15 P1 413.5 P2 153.9

icalid

(TDC counts)

Hut 2.13.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.7

Hut 2.13.7 icalid

Δfit (TDC counts)

0.162478 ns/TDCcount

TDC calibrations Calib 8560.1

0 2500

5000

10 20 30

14.24 / 14 P1 215.6 P2 153.4

icalid

(TDC counts)

Hut 2.13.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.8

Hut 2.13.8 icalid

Δfit (TDC counts)

0.162921 ns/TDCcount

0 2500

5000

10 20 30

18.07 / 15 P1 247.2 P2 152.5

icalid

(TDC counts)

Hut 2.14.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.3

Hut 2.14.3 icalid

Δfit (TDC counts)

0.163953 ns/TDCcount

0 2500

5000

10 20 30

15.99 / 15 P1 292.7 P2 152.0

icalid

(TDC counts)

Hut 2.14.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.4

Hut 2.14.4 icalid

Δfit (TDC counts)

0.164507 ns/TDCcount

0 2500

5000

10 20 30

15.29 / 14 P1 209.1 P2 151.8

icalid

(TDC counts)

Hut 2.14.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.5

Hut 2.14.5 icalid

Δfit (TDC counts)

0.164651 ns/TDCcount

0 2500

5000

10 20 30

16.43 / 15 P1 246.3 P2 152.8

icalid

(TDC counts)

Hut 2.14.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.6

Hut 2.14.6 icalid

Δfit (TDC counts)

0.163664 ns/TDCcount

TDC calibrations Calib 8560.1

0 2500

5000

10 20 30

11.31 / 14 P1 501.6 P2 154.3

icalid

(TDC counts)

Hut 2.14.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.7

Hut 2.14.7 icalid

Δfit (TDC counts)

0.162042 ns/TDCcount

0 2500

5000

10 20 30

8.295 / 14 P1 443.4 P2 153.9

icalid

(TDC counts)

Hut 2.14.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.8

Hut 2.14.8 icalid

Δfit (TDC counts)

0.162462 ns/TDCcount